;
; pico.def
; Linker module definition file for pico editor interface
;
LIBRARY PICOLIB INITINSTANCE
DESCRIPTION 'UW pico editor interface'
DATA
  MULTIPLE NONSHARED
EXPORTS
  ; pico interface
  pico
  pico_get
  pico_give
  pico_seek
  pico_new_mail
  pico_nbcolor
  pico_rbcolor
  pico_nfcolor
  pico_rfcolor
  pico_puts
  pico_readc
  pico_writec
  pico_fncomplete
  pico_file_browse
  ; pc functions
  ibmgetc
  ibmbeep
  ibmputc
  ibmeeol
  ibmeeop
  ibmmove
  ibmopen
  ibmclose
  ibmrev
  vidUpdate
  ; keyboard interface
  kbd_ready
  kbd_getkey
  kbd_flush
  ; mouse/key functions
  clear_mfunc
  register_mfunc
  init_mouse
  end_mouse
  checkmouse
  mouseon
  mouseoff
  register_key
  mouse_get_last
  ; utility functions
  interrupt_ok
  dont_interrupt
  win_multiplex
  enter_text_mode
  exit_text_mode
  normalize_cmd
  rebindfunc
  time_to_check
  wquit
  readin
  update
  edinit
  mpresf
  vtinit
  movecursor
  GetKey
  mouse_in_content
  mlerase
  execute
  makename
  forwdel
  forwline
  emlwrite
  bindtokey
  quickexit
  fixpath
  set_browser_title
  gethomedir
  FileBrowse
  ; exported global data
  timeout
  userfillcol
  alt_speller
  sup_keyhelp
  term
  peeol
  gmode
  curbp
  curwp
  Pmaster
  lastflag
  opertree
  km_popped
  os2_fflush
